Copyright: Saturday, January 04, 2003 15:51:58


Select to have Windows Script Host stop script execution after a script runs for a specified number of seconds. This is a global property for all scripts that are executed by the Windows Script Host.


Provides a space for you to type the number of seconds to allow scripts to run.

You must select the Stop scripts after specified number of seconds check box to change this option.


Specifies whether to display Windows Script Host version information each time you run a script. This is a global property for all scripts that are executed by the Windows Script Host.


Resets Windows Script Host settings to the following defaults:

Stop script after specified number of seconds - cleared

Seconds - disabled (and reset to 10 seconds)

Display logo when script executed in command console - checked


Select to have Windows Script Host stop execution of the selected script after it runs for a specified number of seconds.


Provides a space for you to type the number of seconds to allow the selected script to run.

You must select the Stop script after specified number of seconds check box to change this option.


Select to have Windows Script Host display Windows Script Host version information each time you run the selected script.


Resets Windows Script Host settings to the following defaults:

Stop script after specified number of seconds - cleared

Seconds - disabled (and reset to 10 seconds)

Display logo when script executed in command console - checked