Copyright: Tuesday, April 17, 2001 04:11:33


Specifies that you want to type by clicking keyboard characters with a mouse or joystick.


Specifies that you want to type by pointing at keyboard characters with a mouse or joystick.


When Hover to select is selected, Minimum time to hover adjusts the amount of time (anywhere from one-half to three seconds) that will elapse before a character is selected. To change the setting, select a time from the drop-down list.


Specifies that you want to type by selecting highlighted keyboard characters with a designated keyboard key, mouse, or joystick.


When Joystick or key to select is selected, scanning mode is initiated. To change the amount of time (anywhere from one-half to three seconds), keyboard characters are scanned and highlighted, select a time from the drop-down list.


Closes the dialog box and saves any changes you have made.


Closes the dialog box without saving any changes you have made.


Allows you to choose between using a mouse, joystick, or a keyboard key to start a scan of the keyboard.


Allows you to use a mouse or joystick to start a scan of the keyboard. Then you will use the mouse or joystick to type the keyboard character.


Allows you to designate a keyboard key to start a scan of the keyboard. Then you will press the keyboard key to type the keyboard character.