Copyright: Tuesday, April 17, 2001 04:11:16


Changes the amount of magnification.


Specifies whether to display a magnified area by following the mouse pointer.


Specifies whether to display a magnified area by following keyboard commands, such as the TAB or arrow keys.


Specifies whether to display a magnified area by following the insertion point while typing.


Specifies whether to invert the colors in the magnification window.


Specifies whether to use the High Contrast mode, including a special color scheme.


Minimizes the Magnifier Settings dialog box.


Quits Magnifier.


Specifies whether the Magnifier Settings dialog box is minimized when Magnifier starts.


Specifies whether to display Magnifier while displaying the Magnifier Settings dialog box.