Copyright: Saturday, January 04, 2003 15:50:46


Sends the selected files over the infrared connection.


Displays the Wireless Link dialog box, where you can view image transfer, file transfer, and hardware settings.


Closes this dialog box.


Lists the infrared devices that are in range of the infrared transceiver on your computer. Click the device you want to receive files.


Displays Help for infrared and Wireless Link.


Specifies whether to display an icon in the notification area when there is a wireless connection.


Specifies whether to play a sound when another infrared device is nearby.


Specifies whether other computers can send files to this computer over the Wireless Link connection. If cleared, any computer that attempts to send files over the Wireless Link connection displays an error message indicating that access is denied and that the file transfer failed.


Specifies whether to display the transfer status when this computer is receiving files from another computer.


Displays the current location where files received over Wireless Link connections will be saved. Click Browse to change the location.


Click to change the location where files received over Wireless Link connections will be saved.


Specifies whether to use Wireless Link to transfer images from a camera to your computer.


Displays the folder where the images are stored after they are transferred to the computer. Click Browse to change the location.


Click to change the location where images are stored after they are transferred to the computer.


Specifies whether Windows Explorer automatically opens to the folder shown above after you transfer images from a camera.


Specifies the location where you want transferred images saved. Use this to select whether to display the contents of the location with Windows Explorer after the images are transferred.


Reposition the infrared transceivers until the [image] icon appears in the notification area.


Shows the current setting for the maximum speed in bits per second (BPS) at which the infrared device can transfer data. Click a different speed to change this setting.


Shows the port currently used by the infrared device. Click a different port to change this setting.